ANNEX TECHNICAL SPECIFICATIONS FOR A COMMON TEMPLATE FOR THE ‘ TRUSTED LIST OF SUPERVISED/ACCREDITED CERTIFICATION SERVICE PROVIDERS ’
GENERAL REQUIREMENTS

2. Structure of the Common Template for the Trusted List

2.1. Description of information in each category

5. For each listed certification service, the historical information about his status
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Decision revoked (31.12.2020) by The Electronic Identification and Trust Services for Electronic Transactions (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/89), reg. 1(2), Sch. para. 45; 2020 c. 1, Sch. 5 para. 1(1)