ANNEX II DUTIES AND TASKS OF THE ... REFERENCE LABORATORY
4. The reference laboratory must provide scientific and technical assistance to the appropriate authority, especially in cases where there are reasonable grounds to contest the results of analyses related to the duties and tasks referred to in this Annex, without prejudice to any role defined for it under Regulation (EU) 2017/625.
Substituted by Commission Regulation (EC) No 378/2005 of 4 March 2005 on detailed rules for the implementation of Regulation (EC) No 1831/2003 of the European Parliament and of the Council as regards the duties and tasks of the Community Reference Laboratory concerning applications for authorisations of feed additives (Text with EEA relevance).
Words in Annex 2 point 4 substituted (31.12.2020) by The Animal Feed (Amendment) (EU Exit) Regulations 2019 (S.I. 2019/654), regs. 1, 33(g)(i); 2020 c. 1, Sch. 5 para. 1(1)
Words in Annex 2 point 4 substituted (31.12.2020) by The Animal Feed (Amendment) (EU Exit) Regulations 2019 (S.I. 2019/654), regs. 1, 33(g)(ii); 2020 c. 1, Sch. 5 para. 1(1)
Words in Annex 2 point 4 substituted (31.12.2020) by The Animal Feed (Amendment) (EU Exit) Regulations 2019 (S.I. 2019/654), regs. 1, 33(g)(iii); 2020 c. 1, Sch. 5 para. 1(1)
Words in Annex 2 point 4 substituted (31.12.2022) by The Food and Feed (Miscellaneous Amendments) Regulations 2022 (S.I. 2022/1351), regs. 1(1), 8(10)(b)
Word in Annex 2 heading omitted (31.12.2020) by virtue of The Animal Feed (Amendment) (EU Exit) Regulations 2019 (S.I. 2019/654), regs. 1, 33(a); 2020 c. 1, Sch. 5 para. 1(1)