Article 7 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Commission Regulation (EC) No 1236/2007 of 22 October 2007 amending Regulation (EC) No 1974/2006 for the purposes of implementing Council Regulation No 378/2007 on voluntary modulation.