CHAPTER VI FINAL PROVISIONS
Article 28 Regulation (EEC) No 3820/85 is hereby repealed and replaced by this Regulation.
Notwithstanding, paragraphs 1, 2 and 4 of Article 5 of Regulation (EEC) No 3820/85 shall continue to apply until the dates set out in Article 15(1) of Directive 2003/59/EC.