1 Title and commencement
1 This Order may be cited as the Human Organ Transplants (Northern Ireland) Order 1989.
2 Except as provided by paragraph (3), this Order shall come into operation on the expiration of two months from the day on which it is made.
3 Article 4(1) shall come into operation on such day as the Head of the Department may by order appoint.
fully exercised by SR 1990/355

Order repealed (1.9.2006) by Human Tissue Act 2004 (c. 30), ss. 57, 60(2), Sch. 7 Pt. 2; S.I. 2006/1997, art. 3(2) (with arts. 4, 7, 8 (as added by S.I. 2006/2169, art. 2(3))