SCHEDULE 1 Rendering requirements

Part II Methods of rendering

Method 5 Natural fat continuous atmospheric

2 Crushing
The raw material shall be reduced in size by crushing so that the particle size does not exceed 30 mm. Final reduction equipment shall be checked daily and its condition recorded. Any broken equipment shall be repaired without delay to ensure that the final particle size is achieved.