2 Amendment of regulation 1 of the principal Regulations
In regulation 1(2) of the principal Regulations (interpretation) in the definition of “health service sight test fee”—
(a) in sub-paragraph (a) for “£41·54” there shall be substituted “£42·79”; and
(b) in sub-paragraph (b) for “£15·01” there shall be substituted “£15·46”.