SCHEDULE 1 CONDITIONS OF ELIGIBILITY FOR GBROCS
17 (a) This paragraph applies where an extant qualifying arrangement (“the applicable qualifying arrangement”) provides for the building of a generating station (“the specified station”) at a specified location (“the location”) and the specified station has not been commissioned.
(b) If this paragraph applies then it is a condition of eligibility that the electricity to which the GBROC relates was not generated by a generating station which is situated at the location and which is owned or operated by a person who is a party to the applicable qualifying arrangement, or is a connected person or a linked person in relation to any such party.
(c) This paragraph does not apply to a GBROC relating to electricity generated by a generating station which, during the month in question, generates only electricity which is sold pursuant to another extant qualifying arrangement.