2009 No. 184
Environmental Protection
The Fluorinated Greenhouse Gases Regulations (Northern Ireland) 2009 (revoked)
Regulations revoked (31.1.2016) by The Fluorinated Greenhouse Gases Regulations (Northern Ireland) 2015 (S.R. 2015/425), regs. 1(1), 30(a) (with reg. 29)
Made 6th May 2009
Coming into operation in accordance with regulation 1.

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART 1 Introductory provisions

1 Citation, commencement and application
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2 Interpretation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3 Competent authority
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART 2 General provisions

4 Leakages
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5 Leakage checks of stationary equipment
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6 Leakage checks of fire protection systems
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7 Leakage detection systems
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

8 Records
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

9 Recovery of fluorinated greenhouse gases
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

10 Taking delivery of fluorinated greenhouse gases
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

11 Reporting requirements and the provision of information
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

12 Labelling
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

13 Instruction manuals
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

14 Prohibition on the use of sulphur hexafluoride
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

15 Placing on the market
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART 3 Qualifications

CHAPTER 1 Stationary refrigeration, air conditioning and heat pump equipment

16 ... certification and evaluation bodies
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

17 Qualifications of individuals relating to certain stationary equipment
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

18 Interim stationary equipment certificates for individuals – stationary equipment
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

19 Certification bodies for companies – stationary equipment
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

20 Certificates for companies – stationary equipment
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

21 Interim company certificates – stationary equipment
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

22 Certificates relating to certain stationary equipment issued in other EEA states and Great Britain
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
CHAPTER 2

Fire protection systems and fire extinguishers

23 The certification and evaluation bodies
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

24 Qualifications of individuals relating to fire protection systems
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

25 Interim fire protection system certificates for individuals
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

26 Certification bodies for companies – fire protection systems
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

27 Certificates for companies – fire protection systems
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

28 Interim company certificates – fire protection systems
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

29 Certificates relating to fire protection systems issued in other EEA states and Great Britain
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
CHAPTER 3

High-voltage switchgear

30 Certification and evaluation bodies
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

31 Qualification of individuals relating to high-voltage switchgear
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

32 Certificates relating to high-voltage switchgear issued in other EEA states and in Great Britain
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
CHAPTER 4

Fluorinated greenhouse gas-based solvents

33 Fluorinated greenhouse gas-based solvents certification and evaluation bodies
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

34 Qualification of individuals relating to fluorinated greenhouse gas-based solvents
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

35 Certificates relating to fluorinated greenhouse gas-based solvents issued in EEA states and in Great Britain
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
CHAPTER 5

Air conditioning systems in certain motor vehicles

36 Attestation bodies
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

37 Qualifications relating to air conditioning systems in motor vehicles
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

38 Attestations issued in EEA states and in Great Britain
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
CHAPTER 6

Miscellaneous obligations

39 Obligation of employers to employ qualified employees
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

40 Training records
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

41 Obligations of certification bodies, attestation bodies and evaluation bodies to provide information
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART 4 Enforcement, offences and penalties

42 Powers of authorised persons
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

43 Information notices
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

44 Enforcement ... notices
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

45 Appeals against enforcement ... notices
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

46 Enforcement by the High Court
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

47 Miscellaneous offences
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

48 Corporate offences
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

49 Penalties
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

50 Fixed penalties
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

51 Enforcement
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

52 Application to the Crown
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SCHEDULE 1 Category I, II, III and IV certificates
Regulation 17(3)
1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SCHEDULE 2 Interim Qualifications
Regulations 18(2), 18(3)(a) and 37(3)
PART 1 1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
PART 2 3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
10 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
11 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
12 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
13 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
14 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
15 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
16 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
17 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
18 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
19 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
20 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
21 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
22 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
23 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
24 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
25 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SCHEDULE 3 Form of fixed penalty notice
Regulation 50(7)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .