PART 3 CONFORMITY ASSESSMENT

38 Presumption of conformity
1 A product which is in conformity with a harmonised standard (or part of such a standard) the reference to which has been published in the Official Journal is presumed to be in conformity with the essential health and safety requirements covered by that standard (or that part of that standard).
2 The presumption in paragraph (1) is rebuttable.