SCHEDULE 1 ESSENTIAL HEALTH AND SAFETY REQUIREMENTS

POTENTIAL IGNITION SOURCES

25 Risks arising from software
In the design of software-controlled equipment, protective systems and safety devices, special account shall be taken of the risks arising from faults in the programme.