SCHEDULE 2 NOTIFIED BODY REQUIREMENTS
11 A conformity assessment body shall have the means necessary to perform the technical and administrative tasks connected with the conformity assessment activities in an appropriate manner and shall have access to the necessary equipment or facilities to enable it to perform those activities.