SCHEDULE 7 Requirements for assessment methods other than fixed measurement

PART 1 Group A pollutants
1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulations revoked (11.6.2010) by The Air Quality Standards (Scotland) Regulations 2010 (S.S.I. 2010/204), regs. 1(1), 29