4 Installation notice requirements
1 Where proposing an installation, the owner must give notice to each owner of the other part of the tenement of—
(a) the nature and extent of the work to be carried out;
(b) the safety standards which the work is required to meet;
(c) a timetable for carrying out the work, including the dates by which it is proposed the work will be commenced and completed;
(d) what disruption (if any) is expected to be caused;
(e) arrangements that will be put in place to ensure the work is completed;
(f) the arrangements for maintaining and repairing the equipment, once it is installed;
(g) what insurance is in place during the work to install the service; and
(h) the address to which any objections or other representations relating to the notice are to be sent.
2 The notice must be in the form specified in schedule 1.