1 Citation, commencement and interpretation
1 These Regulations may be cited as the Patient Safety Commissioner for Scotland Act 2023 (Commencement) Regulations 2024 and come into force on 1 May 2024.
2 In these Regulations, “the Act” means the Patient Safety Commissioner for Scotland Act 2023.