SCHEDULE 2 Regulated Activities: General exceptions
5 Paragraph 4 does not apply in relation to—
(a) treatment carried out under anaesthesia or intravenously administered sedation;
(b) dental treatment carried out under general anaesthesia;
(c) obstetric services and, in connection with childbirth, medical services;
(d) the termination of pregnancies;
(e) cosmetic surgery, with the exception of the procedures referred to in paragraph 7(4) of Schedule 1;
(f) haemodialysis or peritoneal dialysis;
(g) endoscopy; or
(h) the provision of hyperbaric therapy, being the administration of oxygen (whether or not combined with one or more other gases) to a person who is in a sealed chamber which is gradually pressurised with compressed air, where such therapy is carried out by or under the supervision or direction of a medical practitioner.