11 Wards of the parish of Little Missenden and number of councillors
1 The parish of Little Missenden is divided into three wards named respectively—
(a) Holmer Green;
(b) Hyde Heath;
(c) Little Kingshill and Little Missenden.
2 Each ward comprises the area designated on the map by reference to the name of the ward.
3 Seven councillors are to be elected for Holmer Green ward.
4 Four councillors are to be elected for Little Kingshill and Little Missenden ward.
5 Two councillors are to be elected for Hyde Heath ward.