SCHEDULE 1975 ENACTMENTS AS AMENDED

Industry Act 1975 (c.68)
8 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Entry in Sch. repealed (6.1.1992) by British Technology Group Act 1991 (c. 66, SIF 64), s. 17(2), Schedule 2 Part I; S.I. 1991/2721, art. 2
Entry in Sch. repealed (6.1.1992) by British Technology Group Act 1991 (c. 66, SIF 64), s. 17(2), Schedule 2 PartI; S.I. 1991/2721, art.2
The text of ss. 1, 2(2) and the Schedule is in the form in which it was originally enacted: it was not reproduced in Statutes in Force and, except as specified, does not reflect any amendments or repeals which may have been made prior to 1.2.1991.