SCHEDULES

SCHEDULE 1 Optical Appliances

Part II Amendments of National Health Service (Scotland) Act 1978
4 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Sch. 1, Pt. II para. 4 repealed (1.4.2006) by Smoking, Health and Social Care (Scotland) Act 2005 (asp 13), Sch. 3; S.S.I. 2006/121, sch. 2
The text of Sch. 1 is in the form in which it was originally enacted: it was not reproduced in Statutes in Force and does not reflect any amendments or repeals which may have been made prior to 1.2.1991