SCHEDULES

SCHEDULE 1 Optical Appliances

Part II Amendments of National Health Service (Scotland) Act 1978
5 In sub-paragraph (1) of paragraph 2 of Schedule 11 to that Act (charges for dental or optical appliances) the following entry shall be substituted for the words from “ Glasses ” to the end—

“Glasses.	Such sum as may be determined by or in accordance with directions given by the Secretary of State.”

.
The text of Sch. 1 is in the form in which it was originally enacted: it was not reproduced in Statutes in Force and does not reflect any amendments or repeals which may have been made prior to 1.2.1991