SCHEDULES

SCHEDULE 5 Transitional and Saving Provisions

Fire safety: emergency orders
4 The substitution effected by section 9 of this Act of section 10 of the 1971 Act shall not affect any order of the court in force under that section when that substitution comes into force and any such order may be enforced, or an appeal made against it, accordingly.