PART IV DRY CAPACITY MEASURES

Materials and principles of construction
33 1 Dry capacity measures made of wood (other than measures made of wicker or other open material) of a maximum purported value of 1 gallon or more shall be bound or strengthened with metal or wooden straps or hoops.
2 Such measures of a maximum purported value of 1 peck (2 gallons) or more shall have a metal band fixed around the rim.