SCHEDULE 1 ALTERNATIVE FORM OF STAMP FOR USE BY INSPECTORS FOR STAMPING GLASS, EARTHENWARE OR ENAMELLED METAL MEASURES
A stamp comprising
(i) a crown in the form indicated below; and
(ii) subjacent to the said crown, an identification mark consisting of numerals (or, with the approval of the Board, some other device) identifying the inspector concerned.

DIAGRAM OF THE CROWN REFERRED TO ABOVE

SCHEDULE 2 FORM OF STAMP FOR USE BY INSPECTORS GENERALLY
A stamp comprising—
(i) a crown in the form of the diagram set out in Schedule 1; and
(ii) in close proximity to the said crown, a date mark consisting of numerals indicating the year and (if so desired) the month in which the equipment is stamped; and
(iii) subjacent to the said crown an identification mark consisting of numerals (or with the approval of the Board of Trade, some other device) identifying the inspector concerned.