3 Removals from Schedule
The following provisions are hereby removed from the list of specified provisions in Schedule 1 to the 1978 Act (provisions leading to suspension on medical grounds):—
The Indiarubber Regulations 1922.	S.R. & O. 1922/329, reg. 12.
The Chemical Works Regulations 1922.	S.R. & O. 1922/731, reg. 30.