SCHEDULE 2

PART 17 DEVELOPMENT BY STATUTORY UNDERTAKERS

Class J Post Office

J Permitted development
Development required for the purposes of the Post Office consisting of—
(a) the installation of posting boxes or self-service machines,
(b) any other development carried out in, on, over or under the operational land of the undertaking.