SCHEDULE 2

PART 8 INDUSTRIAL AND WAREHOUSE DEVELOPMENT
Class A

A.2 Interpretation of Class A
(1) For the purposes of Class A—
(a) the erection of any additional building within the curtilage of another building (whether by virtue of this class or otherwise) and used in connection with it is to be treated as the extension of that building, and the additional building is not to be treated as an original building;
(b) where two or more original buildings are within the same curtilage and are used for the same undertaking, they are to be treated as a single original building in making any measurement.