1990 No. 36
WATER, ENGLAND AND WALES
The Bournemouth and District, South West, Tendring Hundred and West Hampshire (Pipelaying and Other Works) (Codes of Practice) Order 1990
Made 9th January 1990

Whereas the Bournemouth and District Water Company, South West Water Services Limited, the Tendring Hundred Waterworks Company and the West Hampshire Water Company (“the Companies”) each hold an appointment under Chapter I of Part II of the Water Act 1989 as a water undertaker:
1989 c. 15
And whereas each company has, pursuant to section 162(6)(a) of that Act, submitted to the Secretary of State for his approval a Code of Practice with respect to the exercise by it of powers conferred by or by virtue of paragraph 4 of Schedule 19 to that Act (“the Codes of Practice”):
Copies of the Codes of Practice may be inspected at the Department of the Environment, Romney House, 43 Marsham Street, London, SW1P 3PY, and may be obtained free of charge from the appropriate company; Bournemouth and District Water Company, PO Box 8, Francis Avenue, Bournemouth, Dorset, BH1 8NB, South West Water Services Limited, Peninsula House, Rydon Lane, Exeter, Devon, EX2 7HR, the Tendring Hundred Waterworks Company, Mill Hill, Manningtree, Essex, CO11 2AZ, the West Hampshire Water Company, Knapp Mill, Mill Road, Christchurch, Dorset, BH23 2LU.
And whereas the Secretary of State considers it appropriate, for the purpose of promoting what appear to him to be desirable practices with respect to the exercise by the Companies of those powers, to approve the Codes of Practice:
And whereas the Secretary of State considers that there are no persons with whom consultation with regard to the Codes of Practice is appropriate:
Now, therefore, the Secretary of State, in exercise of the powers conferred on him by section 162(7) of the Water Act 1989, hereby makes the following Order: