SCHEDULE SAFETY ZONES
Article 2
(1)	(2)	(3)
Name or other designation of the offshore installation	Latitude North	Longitude East
Anglia West Subsea Structure	53 ° 22' 22.11"	01 ° 34' 50.2"
Phillips Ann Subsea Installation	53 ° 42' 55"	01 ° 03' 22"
Brent South Subsea Wellhead	60 ° 59' 33.60"	01 ° 40' 57.79"