1994 No. 1886
HEALTH AND SAFETY
The Gas Safety (Installation and Use) Regulations 1994
Made 15th July 1994
Laid before Parliament 20th July 1994
Coming into force
Regulation 3(3) (to the extent specified in regulation 1(3)) 1st April 1995
Regulation 30(2) and (3) 1st January 1996
Regulation 14(2) and (5)(b) 1st January 1997
Regulation 14(4) (to the extent specified in regulation 1(4)(b)) 1st January 1997
The remainder 31st October 1994

The Secretary of State in exercise of the powers conferred on him by sections 15(1), (2), (4)(a), (5), (6)(b) and 82(3)(a) of, and paragraphs 1(1), (2) and (3), 4(1), 12 and 16 of Schedule 3 to, the Health and Safety at Work etc. Act 1974 (“the 1974 Act”) and of all other powers enabling him in that behalf and for the purpose of giving effect without modifications to proposals submitted to him by the Health and Safety Commission under section 11(2)(d) of the 1974 Act after the carrying out by the said Commission of consultations in accordance with section 50(3) of that Act, hereby makes the following Regulations:—
1974 c. 37; section 1(1) was extended by section 2(1) of the Offshore Safety Act 1992 (c. 15), and sections 15 and 50 were amended by the Employment Protection Act 1975 (c. 71), Schedule 15, paragraphs 6 and 16 respectively.