SCHEDULE 1 TERMS OF SERVICE FOR DENTISTS

PART II continuing care arrangement, capitation arrangement and treatment on referral

7 Repair or replacement of restorations
(1) Subject to sub-paragraph (3), in repairing or replacing a restoration in the course of a continuing care arrangement, a dentist shall repair or replace at no charge to the patient any restoration specified in sub-paragraph (2) which he or another dentist, acting on his behalf or from whom the continuing care arrangement was transferred, has provided under general dental services—
(a) under that continuing care arrangement; or
(b) under a capitation arrangement with or transferred to the dentist, where on termination of that arrangement the patient has immediately entered into the continuing care arrangement.
(2) The restorations referred to in sub-paragraph (1) are any filling, root filling, inlay, pinlay or crown which, within 12 months of the date on which it was provided, has to be repaired or replaced to secure oral health.
(3) A dentist shall not be under an obligation to repair or replace any restoration under sub-paragraph (1) where—
(a) within 12 months of the date on which the restoration was provided—
(i) a dentist has provided private treatment; or
(ii) another dentist has provided occasional treatment otherwise than of a temporary nature,
on the tooth in respect of which the restoration was provided;
(b) the dentist advised the patient at the time of the restoration and indicated on any plan for treatment provided to the patient in accordance with paragraph 4(1)(b) or (c) or 5(1)(c) or (d) and on the patient record that;
(i) the restoration was intended to be temporary in nature; or
(ii) in his opinion, a different form of restoration was more appropriate to secure oral health but, notwithstanding that advice, the patient insisted on the restoration which was provided;
(c) in the opinion of the dentist the condition of the tooth in respect of which the restoration was provided is such that the restoration cannot satisfactorily be repaired or replaced and different treatment is now required; or
(d) the repair or replacement is required as a result of trauma.
(4) The obligation to repair or replace any restoration under sub-paragraph (1) begins on the date on which the patient and the dentist enter into the continuing care arrangement and ceases when that arrangement lapses or is terminated.