SCHEDULE THE STAFFORDSHIRE FIRE SERVICES COMBINATION SCHEME

PART II GENERAL

4 Combined Fire Authority
(1) There shall be constituted as the fire authority for the combined area an authority to be known as the Stoke-on-Trent and Staffordshire Fire Authority.
(2) The Authority shall be constituted in accordance with the provisions of Part III.