7 Procedures and Arrangements Manual
1 Every ship carrying noxious liquid substances shall be provided with a Procedures and Arrangements Manual complying with IMO Standards.
2 Such a manual shall be approved, in the case of a United Kingdom ship, by the Secretary of State or, in the case of a ship registered in a State Party to the MARPOL Convention by or on behalf of the government of that State.
3 The Procedures and Arrangements Manual shall be kept on board the ship in such a place as to be readily available for inspection.
4 The Procedures and Arrangements Manual shall, in the case of a United Kingdom ship, be in English and, in the case of any other ship, be in, or include a translation into English or French.