1 Citation, commencement and interpretation
1 These Regulations may be cited as the National Health Service (General Medical Services) Amendment (No. 2) Regulations 1998 and shall come into force on 10th December 1998.
2 In these Regulations, “the principal Regulations” means the National Health Service (General Medical Services) Regulations 1992.
S.I. 1992/635; relevant amending instruments are S.I. 1994/633, 1995/80, 1995/3093, 1997/2468 and 1998/682.