SCHEDULE 4 Additional Mark for foreign origin export eligible goods
1 The additional mark for application to meat using a marking instrument shall consist of an elongated hexagonal mark, with two parallel straight sides of 4.5 cm length, 4.5 cm apart and joined by two shorter sides of equal length to form a point at each end, so that the mark is 8.5 cm long from point to point; bearing on the upper part the initials XAP and in the lower part the approval number of the establishment at which the mark is applied, e.g. 31/1, the letters and figures being at least 1.0 centimetre high and, together with the hexagonal mark, legible and indelible.
An example follows: