7 Wards of the city of Ripon
1 The existing wards of the city of Ripon shall be abolished.
2 The city shall be divided into three city wards which shall bear the names Ripon Minster, Ripon Moorside and Ripon Spa; and each city ward shall comprise the area of the borough ward bearing the same name.
3 The number of councillors to be elected for each city ward shall be five.