2001 No. 3421
ELECTRICITY
The Central Electricity Generating Board (Dissolution) Order 2001
Made 16th October 2001
Laid before Parliament 18th October 2001
Coming into force 9th November 2001

The Secretary of State, in exercise of the powers conferred on her by section 84(4) of the Electricity Act 1989, after consultation with the Central Electricity Generating Board (“the CEGB”) and its successor companies and being satisfied that nothing further remains to be done by the CEGB (whether under Schedule 17 to that Act or otherwise), hereby makes the following Order:
1989 c. 29.

1 This Order may be cited as the Central Electricity Generating Board (Dissolution) Order 2001 and shall come into force on 9th November 2001.
2 The Central Electricity Generating Board shall be dissolved on the day on which this Order comes into force.
Brian Wilson, Minister of State for Industry and Energy, Department of Trade and Industry 16th October 2001

(This note is not part of the Order)
This Order dissolves the Central Electricity Generating Board (“CEGB”) with effect on 9th November 2001. The property, rights and liabilities of the CEGB were transferred to nominated successor companies (see S.I.1990/224) on 31st March 1990 under section 66 of the Electricity Act 1989. Section 84 of that Act provides for the CEGB to continue in existence after the transfer date, and Schedule 17 to the Act provides for certain duties to be carried out as necessary by the CEGB. Those duties, so far as necessary and as applying to the CEGB, have been discharged.