SCHEDULE AMENDMENTS CONSEQUENTIAL ON PART 1 OF THE NATIONAL HEALTH SERVICE REFORM AND HEALTH CARE PROFESSIONS ACT 2002

PART 2 STATUTORY INSTRUMENTS

National Health Service (Charges for Appliances) Regulations 1974
2 In regulation 2 of the National Health Service (Charges for Appliances) Regulations 1974 (interpretation), in paragraph (1), for the definition of “Authority” there shall be substituted—

““Authority” means—
(a) in relation to England, a Primary Care Trust; and
(b) in relation to Wales, a Local Health Board;”

.
S.I.1974/284 as amended by S.I.1974/609, 1982/288, 1986/976 and 1991/583.