2 Section 4(1)(e) of the Supreme Court Act 1981, prescribing the maximum number of puisne judges of the High Court, shall be amended so as further to increase the maximum number of those judges to 108.
Section 4(1)(e) was amended by S.I.1987/2059, S.I.1993/1255 and 1999/3138.