PART 5 AMENDMENT OF THE GENERAL MEDICAL SERVICES AND PERSONAL MEDICAL SERVICES TRANSITIONAL AND CONSEQUENTIAL PROVISIONS ORDER 2004

18 Revocation of article 34 of the General Medical Services and Personal Medical Services Transitional and Consequential Provisions Order 2004
Article 34 of the General Medical Services and Personal Medical Services Transitional and Consequential Provisions Order 2004 (arrangements for GP Registrars) is revoked.
S.I. 2004/865.