SCHEDULES

SCHEDULE 8 PROTECTIVE PROVISIONS

PART 3 PROTECTION FOR SEWERAGE UNDERTAKERS
19 As soon as reasonably practicable after the completion of the construction of the specified work, the Council shall deliver to the undertaker a plan and section showing the position and level of that work as constructed and all new, altered or substituted works provided under this Part of this Schedule.