SCHEDULE 2 STANDARD PROVISIONS WHICH MAY BE INCORPORATED IN A MANUFACTURER'S LICENCE RELATING TO THE IMPORT OF RELEVANT MEDICINAL PRODUCTS FROM A THIRD COUNTRY
3 The manufacturer’s licence holder shall provide such information as may be requested by the licensing authority concerning the type and quantity of any medicinal products which he imports.