PART 9 HOME CONDITION REPORT REGISTER

CHAPTER 2 ARRANGEMENTS FOR KEEPING THE REGISTER

42 Retention of home condition reports
1 Subject to paragraph (2), a home condition report entered onto the register must be cancelled from the register in the event that a person operating an approved certification scheme informs the keeper of the register that there is an inaccuracy in the report.
2 Except in the circumstances described in paragraph (1), a home condition report entered onto the register must be kept on the register for no less than 15 years from the date on which it is entered onto the register.