SCHEDULE 8 Drainage and water enquiries

PART 2 Enquiries and responses

21 Risk of flooding due to overloaded public sewers
(1) Is the dwelling-house which is or forms part of the property at risk of internal flooding due to overloaded public sewers?
(2) (a) Records confirm that the property is at risk of internal flooding due to overloaded public sewers (following an actual flooding event or otherwise) and a report is included describing—
(i) this and the action proposed by the sewerage undertaker to remove the risk;
(ii) who will undertake this action and when; and
(iii) whether mitigation measures have been installed to reduce the risk of flooding to the property;
(b) An investigation is currently being carried out by the sewerage undertaker to determine if the property should be recorded on a register as being at risk of internal flooding due to overloaded public sewers, and a report is included describing—
(i) the action proposed by the water undertaker to remove the risk; and
(ii) who will undertake the action and when; or
(c) The property is not recorded as being at risk of internal flooding due to overloaded public sewers.