SCHEDULE 5 Additional conditions applicable to all systems in which laying hens are kept
2 In all systems in which laying hens are kept—
(a) the sound level must be minimised;
(b) constant or sudden noise must be avoided; and
(c) ventilation fans, feeding machinery and other equipment must be constructed, placed, operated and maintained in such a way that they cause the least possible noise.