SCHEDULE FREQUENCY BANDS
Regulations 4 to 7

PART 1 FIXED SERVICE BANDS
1.6605–1.6680 GHz
1.668–1.670 GHz
10.60–10.68 GHz
22.01–22.21 GHz
22.21–22.50 GHz
22.81–22.86 GHz
23.07–23.12 GHz
31.5–31.8 GHz

PART 2 MOBILE SERVICE BANDS
37.75–38.25 MHz
80.5–82.5 MHz
150.05–152.00 MHz

PART 3 BROADCASTING SERVICE BAND
606–614 MHz

PART 4 FIXED SUM BANDS
1.400–1.427 GHz
1.6106–1.6138 GHz
1.6600–1.6605 GHz
2.69–2.70 GHz
10.68–10.70 GHz
15.35–15.40 GHz
23.6–24.0 GHz
31.3–31.5 GHz
42.5–43.5 GHz
48.94–49.04 GHz