PART 1 Introduction

1 Citation and commencement
This Order may be cited as the Water Use (Temporary Bans) Order 2010 and comes into force on 1st October 2010.

2 Interpretation
In this Order—
“the Act” means the Water Industry Act 1991;
“grow” includes cultivate or propagate;
“health or safety reasons” includes—
(a) removing or minimising any risk to human or animal health or safety; and
(b) preventing or controlling the spread of causative agents of disease;
“National Plant Collection” means a plant collection which is part of the National Council for the Conservation of Plants and Gardens’ National Plant Collection scheme;
“outdoor pot” means a pot or other container that is outdoors or under cover;
“temporary garden or flower display” means a garden or flower display that is—
(a) at a show or exhibition; and
(b) on public display for a period not exceeding 7 days; and
“under cover” means in a greenhouse or outbuilding or under a permanent canopy.