SCHEDULE Information provisions
Regulation 11

1 Reporting obligations of relevant institutions
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2 Powers to request information
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3 Production of documents
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4 Failure to comply with request for information
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5 General power to disclose information
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6 Application of provisions
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulations revoked (30.9.2016) by The Cote d'Ivoire (Asset-Freezing) (Revocation) Regulations 2016 (S.I. 2016/893), regs. 1, 2(b)