2 Amendment to the Private Security Industry Act 2001 (Approved Contractor Scheme) Regulations 2007
The Private Security Industry Act 2001 (Approved Contractor Scheme) Regulations 2007 are amended by substituting “£15” for “£17” in regulation 5.
Reg. 2 in force at 1.1.2012, see reg. 1
S.I. 2007/808, amended by S.I 2007/2504; there is another amending instrument but it is not relevant to these Regulations.