PART 2 HARBOUR REGULATIONS

7 Subsidiary works
1 Subject to paragraph (2) and to the other provisions of this Order, the City Council or a person authorised by the City Council to carry out the authorised works may, in connection with those works and within the limits of deviation, construct, erect, lay down, place, maintain, remove, replace, work or use all necessary or convenient bridges, abutments, booms, pontoons, fenders, bollards, ladders, tanks, pumps, conduits, pipes, wires, mains, cables, rails, signals, conveyors, cranes, lifts, hoists, passenger side loaders, drops, weighbridges, stairs, stages, platforms, catwalks, landing places, dolphins, piles, buoys, moorings, beacons, approaches, buildings, sheds, offices, depots, roads, walls, fences, gates, equipment, machinery and appliances and such other works and apparatus as they think fit.
2 Electrical works, mechanical works or equipment constructed, erected, laid down, placed, maintained, worked or used, pursuant to the powers conferred by this article, shall be so constructed, erected, laid down, placed, maintained, worked or used, that any electricity generated or conveyed by any such works or equipment used therein or in connection therewith does not cause interference (whether by induction or otherwise) with any telecommunications apparatus or with telecommunication by means of any such apparatus.