PART 3 Amendment of the PDS Regulations

18 Amendment of regulation 14C of the PDS Regulations
In regulation 14C of the PDS Regulations (capitated patients)—
(a) at the beginning of paragraph (1), for “Where a contractor” substitute “Subject to paragraph (3), where a contractor”; and
(b) after paragraph (2), insert—

“3 This regulation does not apply where the contractor is a CDS prototype contractor.”

.
Regulation 14C was inserted by S.I. 2015/1728.